TABLE I

Equilibrium study I-V characteristic I-V characteristic Physical quantity Symbol high-doping (Figs. 3,4,5) high-doping (Figs. 6,8,9) low-doping (Fig. 7)

Bandwidth of left/right lead — 4W 4W 4W Tunnel matrix elements in H_T W_L = W_R 0.1W 0.1W 0.15W Isolated resonance level E_C 0 −0.7W −1.1W Noninteracting resonance level E^0_r 0 −0.71W −1.13W Equilibrium chemical potential μ −0.16W to 0.08W −0.9W −1.5W Phonon frequency Ω 0.2W 0.2W 0.7W Band-width in fixed Ω 4W 20Ω 20Ω 5.7Ω Depth of equilibrium Fermi sea μ + 2W ≈ 10Ω 5.5Ω 0.7Ω